ఢిల్లీలో చినుకులు.. ఆహ్లాదకరంగా వాతావరణం

న్యూఢిల్లీ: దేశ రాజధాని ఢిల్లీలో ఆదివారం చినుకులు కురవడంతో వాతావరణం మళ్లీ ఆహ్లాదకరంగా మారింది. ఎన్‌సీఆర్ ప్రాంతంలో కూడా మేఘావృతమై తేలికపాటి వర్షాలు కురిసే అవకాశం ఉంది. తేలికపాటి గాలి కూడా వీస్తోంది. దీని కారణంగా, ప్రజలు తేమ నుండి ఉపశమనం పొందారు. ఉష్ణోగ్రత కూడా పడిపోయింది.

ఆదివారం ఉదయం కనిష్ట ఉష్ణోగ్రత సాధారణం కంటే ఒక డిగ్రీ ఎక్కువగా నమోదైందని వాతావరణ శాఖ తెలిపింది. ఉదయం కూడా తేలికపాటి వర్షం కురిసే అవకాశం ఉందని వాతావరణ శాఖ తెలిపింది. గరిష్ట ఉష్ణోగ్రత 35.1 డిగ్రీల సెల్సియస్‌గా నమోదైంది. ఇది సగటు ఉష్ణోగ్రత కంటే ఒక డిగ్రీ ఎక్కువ. ఢిల్లీలో ఉదయం 8.30 గంటల వరకు 15 మిల్లీమీటర్ల వర్షం నమోదైంది.

శనివారం భారీ వర్షం కురిసింది
ఢిల్లీ-ఎన్‌సీఆర్‌లో శనివారం మధ్యాహ్నం బలమైన గాలులతో కూడిన వర్షం కురిసింది. మధ్యాహ్నం వాతావరణం మారి ఢిల్లీలో 15.2 మి.మీ వర్షపాతం నమోదైంది. ఈ కాలంలో రిడ్జ్ ప్రాంతంలో గరిష్టంగా 25 మి.మీ, పితంపురాలో 18.5 మి.మీ, ఆయా నగర్‌లో 15.3 మి.మీ, స్పోర్ట్స్ కాంప్లెక్స్‌లో 13.5 మి.మీ, మయూర్ విహార్‌లో 13 మి.మీ, పాలెంలో 14 మి.మీ, లోధి రోడ్డులో 13.6 మి.మీ, ఆరు మి.మీ. నజాఫ్‌గఢ్.

ఢిల్లీలో ఈ నెలలో ఇప్పటివరకు 67.5 మిల్లీమీటర్ల వర్షపాతం నమోదైంది. ఇది సాధారణం (112.8 మిమీ) కంటే 40 శాతం తక్కువ. వర్షం కురిసినా ఢిల్లీలో గాలి నాణ్యత ఓ మోస్తరుగా ఉందని వాతావరణ శాఖ పేర్కొంది.